/*
 Navicat Premium Data Transfer

 Source Server         : 127.0.0.1
 Source Server Type    : MySQL
 Source Server Version : 80034
 Source Host           : 127.0.0.1:3306
 Source Schema         : pvdemcs

 Target Server Type    : MySQL
 Target Server Version : 80034
 File Encoding         : 65001

 Date: 06/11/2023 14:35:01
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for sys_config
-- ----------------------------
DROP TABLE IF EXISTS `sys_config`;
CREATE TABLE `sys_config`  (
  `id` varchar(64) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin NOT NULL COMMENT '参数主键',
  `config_name` varchar(100) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin NULL DEFAULT '' COMMENT '参数名称',
  `config_key` varchar(100) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin NULL DEFAULT '' COMMENT '参数键名',
  `config_value` varchar(500) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin NULL DEFAULT '' COMMENT '参数键值',
  `config_type` char(1) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin NULL DEFAULT 'N' COMMENT '系统内置（Y是 N否）',
  `remark` varchar(500) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin NULL DEFAULT NULL COMMENT '备注',
  `create_by` varchar(64) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin NULL DEFAULT '' COMMENT '创建者',
  `create_at` datetime NULL DEFAULT NULL COMMENT '创建时间',
  `update_by` varchar(64) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin NULL DEFAULT '' COMMENT '更新者',
  `update_at` datetime NULL DEFAULT NULL COMMENT '更新时间',
  `is_delete` bit(1) NOT NULL DEFAULT b'0' COMMENT '是否删除',
  `delete_by` varchar(32) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin NULL DEFAULT NULL COMMENT '删除者',
  `delete_at` datetime NULL DEFAULT NULL COMMENT '删除时间',
  PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_bin COMMENT = '参数配置表' ROW_FORMAT = DYNAMIC;

-- ----------------------------
-- Records of sys_config
-- ----------------------------
INSERT INTO `sys_config` VALUES ('1139430640712261632', 'Ionbond开炉时间', 'Ionbond', '200', 'Y', '', '1', '2023-11-01 21:59:37', '1', '2023-11-01 21:59:37', b'0', NULL, NULL);
INSERT INTO `sys_config` VALUES ('1139430640965279744', 'Balzers开炉时间', 'Balzers', '200', 'Y', '', '1', '2023-11-01 22:00:39', '1', '2023-11-01 22:00:39', b'0', NULL, NULL);
INSERT INTO `sys_config` VALUES ('1139430641060597760', 'CemeCon开炉时间', 'CemeCon', '300', 'Y', '', '1', '2023-11-01 22:01:02', '1', '2023-11-01 22:01:02', b'0', NULL, NULL);

SET FOREIGN_KEY_CHECKS = 1;
